1408283930.5147060

01020304050607080

Number of Park-Phase Buoyancy Adjustments

0 10 20 30 40 50 60 70 80

Profile Number

Time Series of Park-Phase Buoyancy Adjustments (Float 5180)

As of 17 Aug 2014