Park-Level Temperature Statistics (Float 5172)

0 50 100 150 200 250 300 350 400 Profile Number

345678910

T_{Mean} (˚C)

345678910

T_{Max} (˚C)

345678910

T_{Min} (˚C)

0.00.20.40.60.81.0

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 5172)

0 50 100 150 200 250 300 350 400 Profile Number

920960

1000

1040

1080

1120

1160

P_{Mean} (dbar)

920960

1000

1040

1080

1120

1160

P_{Max} (dbar)

920960

1000

1040

1080

1120

1160

P_{Min} (dbar)

05101520253035

P_{StdDev} (dbar)