Park-Level Temperature Statistics (Float 5165)

0 20 40 60 80 100 Profile Number

2468101214

T_{Mean} (˚C)

2468101214

T_{Max} (˚C)

2468101214

T_{Min} (˚C)

0.00.20.40.60.81.0

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 5165)

0 20 40 60 80 100 Profile Number

0250500750 1000

1250

1500

P_{Mean} (dbar)

0250500750

1000

1250

1500

P_{Max} (dbar)

0250500750

1000

1250

1500

P_{Min} (dbar)

0255075100125150

P_{StdDev} (dbar)