Park-Level Temperature Statistics (Float 5125)

0 25 50 75 100 125 Profile Number

0.00.40.81.21.62.02.42.8

T_{Mean} (˚C)

0.00.40.81.21.62.02.42.8

T_{Max} (˚C)

0.00.40.81.21.62.02.42.8

T_{Min} (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 5125)

0 25 50 75 100 125 Profile Number

800850900950

1000

1050

1100

P_{Mean} (dbar)

800850900950

1000

1050

1100

P_{Max} (dbar)

800850900950 1000

1050

1100

P_{Min} (dbar)

0510152025303540

P_{StdDev} (dbar)