1408283247.9849012

0 50 100 150 200 250

Profile Number

Park-Level Temperature Statistics (Float 5112)

23

T_{Mean} (˚C)

23

T_{Max} (˚C)

23

T_{Min} (˚C)

0

T_{StdDev} (˚C)

0 50 100 150 200 250

Profile Number

Park-Level Pressure Statistics (Float 5112)

1750

1800

1850

1900

1950

2000

2050

P_{Mean} (dbar)

1750

1800

1850

1900

1950

2000

2050

P_{Max} (dbar)

1750

1800

1850

1900

1950

2000

2050

P_{Min} (dbar)

05101520253035

P_{StdDev} (dbar)