1408283061.5147060

0.02.55.07.510.012.515.0

Number of Park-Phase Buoyancy Adjustments

0 50 100 150 200 250 300

Profile Number

Time Series of Park-Phase Buoyancy Adjustments (Float 5099)

As of 17 Aug 2014