1408282904.9849012

0 50 100 150 200 250 300

Profile Number

Park-Level Temperature Statistics (Float 5078)

345678910

T_{Mean} (˚C)

345678910

T_{Max} (˚C)

345678910

T_{Min} (˚C)

01

T_{StdDev} (˚C)

0 50 100 150 200 250 300

Profile Number

Park-Level Pressure Statistics (Float 5078)

7508008509009501000

1050

1100

P_{Mean} (dbar)

7508008509009501000

1050

1100

P_{Max} (dbar)

7508008509009501000

1050

1100

P_{Min} (dbar)

01020304050

P_{StdDev} (dbar)