1408282892.9849012

0 40 80 120 160 200 240

Profile Number

Park-Level Temperature Statistics (Float 5077)

25810121518

T_{Mean} (˚C)

25810121518

T_{Max} (˚C)

25810121518

T_{Min} (˚C)

012

T_{StdDev} (˚C)

0 40 80 120 160 200 240

Profile Number

Park-Level Pressure Statistics (Float 5077)

02505007501000

1250

1500

P_{Mean} (dbar)

02505007501000

1250

1500

P_{Max} (dbar)

02505007501000

1250

1500

P_{Min} (dbar)

04080120160200

P_{StdDev} (dbar)