1408282476.9849012

0 40 80 120 160 200

Profile Number

Park-Level Temperature Statistics (Float 5031)

23

T_{Mean} (˚C)

23

T_{Max} (˚C)

23

T_{Min} (˚C)

0

T_{StdDev} (˚C)

0 40 80 120 160 200

Profile Number

Park-Level Pressure Statistics (Float 5031)

8008408809209601000

1040

P_{Mean} (dbar)

8008408809209601000

1040

P_{Max} (dbar)

8008408809209601000

1040

P_{Min} (dbar)

010203040

P_{StdDev} (dbar)