Park-Level Temperature Statistics (Float 5023)

0 50 100 150 200 250 300 350 Profile Number

3.03.23.43.63.84.04.2

T_{Mean} (˚C)

3.03.23.43.63.84.04.2

T_{Max} (˚C)

3.03.23.43.63.84.04.2

T_{Min} (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 5023)

0 50 100 150 200 250 300 350 Profile Number

1750

1800

1850

1900

1950

2000

2050

2100

P_{Mean} (dbar)

1750

1800

1850

1900

1950

2000

2050

2100

P_{Max} (dbar)

1750

1800

1850

1900

1950

2000

2050

2100

P_{Min} (dbar)

01020304050607080

P_{StdDev} (dbar)