1410782271.5493044

0 50 100 150 200 250 300

Profile Number

Time Series of Electric Current Consumption (Float 3288)

02004006008001000

High Pressure Pump Current (mA)

Air Pump Current (mA)

02004006008001000

SBE41 Current (mA)

Quiescent Current (mA)