8.488.528.568.608.648.68

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23748)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

9.96 10.00

10.04

10.08

10.12

10.16

10.20

10.24

Charge Consumption (kC)

12.00

12.05

12.10

12.15

12.20

12.25

12.30

Sleep Period (Hours)

130.5

131.0

131.5

132.0

132.5

133.0

133.5

Wake Period (Minutes)