01020304050

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22981)

0 5 10 15 20 25 30 35 40 Profile Number

0510152025303540

Charge Consumption (kC)

050100150200250

Sleep Period (Hours)

60708090100110

Wake Period (Minutes)