Humidity Time Series for Float 22473

0 1 2 3 4 5 6 7 Profile Number

051015202530

Pneumatic Humidity (%)

051015202530

Park-Level Humidity (%)

Pneumatic Humidity Reference (%)

As of 10 Mar 2026