2468101214

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22210)

0 1 2 3 4 5 6 7 Profile Number

24681012

Charge Consumption (kC)

050100150200250

Sleep Period (Hours)

135140145150155160165170175

Wake Period (Minutes)