1442061462.5493044

0 50 100 150 200 250 300 350 400

Profile Number

Time Series of Battery Potential (Float 2150)

810121416

High Pressure Pump On (Volts) Air Pump On (Volts)

810121416

SBE41 On (Volts)

Quiescent (Volts)