0.000.250.500.751.001.251.50

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 19846)

0 2 4 6 8 10 Profile Number

1.01.52.02.53.03.54.04.55.0

Charge Consumption (kC)

1234567

Sleep Period (Hours)

32.535.037.540.042.545.047.5

Wake Period (Minutes)