-0.20.00.2

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 19626)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.472.482.492.502.512.522.53

Charge Consumption (kC)

11.55

11.60

11.65

11.70

11.75

11.80

11.85

Sleep Period (Hours)

86.086.486.887.287.688.088.4

Wake Period (Minutes)