1.104

1.108

1.112

1.116

1.120

1.124

1.128

1.132

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 17545)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.780

1.785

1.790

1.795

1.800

1.805

1.810

1.815

1.820

Charge Consumption (kC)

11.60

11.65

11.70

11.75

11.80

11.85

Sleep Period (Hours)

347348349350351352353354355

Wake Period (Minutes)