1408280722.5147060

1194.8

1195.2

1195.6

1196.0

1196.4

1196.8

1197.2

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0

Profile Number

Time Series of High Pressure Pump Time (Float 1340)

As of 17 Aug 2014