Park-Level Temperature Statistics (Float 10586)

0 50 100 150 200 250 300 Profile Number

2.93.03.13.23.33.4

T_{Mean} (˚C)

2.93.03.13.23.33.4

T_{Max} (˚C)

2.93.03.13.23.33.4

T_{Min} (˚C)

0.000

0.005

0.010

0.015

0.020

0.025

0.030

0.035

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 10586)

0 50 100 150 200 250 300 Profile Number

900925950975

1000

1025

1050

1075

P_{Mean} (dbar)

900925950975

1000

1025

1050

1075

P_{Max} (dbar)

900925950975 1000

1025

1050

1075

P_{Min} (dbar)

024681012

P_{StdDev} (dbar)