Park-Level Temperature Statistics (Float 10479)

0 50 100 150 200 250 300 Profile Number

04812162024

T_{Mean} (˚C)

04812162024

T_{Max} (˚C)

04812162024

T_{Min} (˚C)

0123456

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 10479)

0 50 100 150 200 250 300 Profile Number

0250500750

1000

1250

1500

P_{Mean} (dbar)

0250500750

1000

1250

1500

P_{Max} (dbar)

0250500750 1000

1250

1500

P_{Min} (dbar)

0100200300400500

P_{StdDev} (dbar)