1438887477.9733172

50100150200250300350

Bottom Buoyancy Position

0 4 8 12 16 20

Profile Number

Buoyancy Position Time Series (Float 0509)

320360400440480520560

Surface Buoyancy Position

Profile Number

Park Buoyancy Position

As of 06 Aug 2015