1408279256.5147060

1380

1400

1420

1440

1460

1480

1500

Pumping Time (seconds)

0.0 0.5 1.0 1.5 2.0 2.5 3.0

Profile Number

Time Series of High Pressure Pump Time (Float 0013)

As of 17 Aug 2014