1425045024.9849012

0 50 100 150 200 250 300

Profile Number

Park-Level Temperature Statistics (Float 0009)

051015202530

T_{Mean} (˚C)

051015202530

T_{Max} (˚C)

051015202530

T_{Min} (˚C)

0123456

T_{StdDev} (˚C)

0 50 100 150 200 250 300

Profile Number

Park-Level Pressure Statistics (Float 0009)

01000

2000

3000

4000

5000

6000

7000

P_{Mean} (dbar)

01000

2000

3000

4000

5000

6000

7000

P_{Max} (dbar)

01000

2000

3000

4000

5000

6000

7000

P_{Min} (dbar)

05001000

1500

2000

2500

3000

3500

P_{StdDev} (dbar)